)c (GeV/ Tp 0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5

πp/

0 0.2 0.4 0.6 0.8 1 1.2

0-5% 20-30% 70-80% w, 0-5% o Krak HKM, 0-5% , 0-5% et al.

Fries (a)